;**************************************************************************
;*         GENERIC.DEF   Module definition file for GENERIC.CPP           *
;**************************************************************************

LIBRARY			GENERIC
DESCRIPTION		'Generic DLL version 1.0'

EXETYPE			WINDOWS
CODE				PRELOAD MOVABLE DISCARDABLE
DATA				PRELOAD MOVABLE SINGLE
HEAPSIZE			1024

; The default .DLL output settings for the Borland linker require that the
; export function names be declared in UPPERCASE characters.  With the
; Microsoft linker, you may use mixed case by default, as in "HelloFromDLL".

EXPORTS			HELLOFROMDLL	@1
					WEP				@2

